ALTER TABLE "PRESSURE2_BOILER_CONNECT_RECORD_REPORT" ADD COLUMN "IS_SIGN" VARCHAR(50);
COMMENT ON COLUMN "PRESSURE2_BOILER_CONNECT_RECORD_REPORT"."IS_SIGN" IS '是否需要签名';