--20260624
ALTER TABLE "PRESSURE2_DYNAMIC_TB" ADD COLUMN "SKIP_PAGE_COUNT" INT DEFAULT (0);
COMMENT ON COLUMN "PRESSURE2_DYNAMIC_TB"."SKIP_PAGE_COUNT" IS '跳过的页码数';
--已加

ALTER TABLE "PRESSURE2_BOILER_CONNECT_RECORD_REPORT" ADD COLUMN "IS_SIGN" VARCHAR(50);
COMMENT ON COLUMN "PRESSURE2_BOILER_CONNECT_RECORD_REPORT"."IS_SIGN" IS '是否需要签名';

ALTER TABLE "PRESSURE2_INSPECTION_NATURE_TEMPLATE" ADD COLUMN "DEFAULT_COUNT" INT DEFAULT (1);
COMMENT ON COLUMN "PRESSURE2_INSPECTION_NATURE_TEMPLATE"."DEFAULT_COUNT" IS '默认数量';

ALTER TABLE "PRESSURE2_EQUIP_BOILER_SCHEDULING_CHECK" ADD COLUMN "DEFAULT_COUNT" INT;
COMMENT ON COLUMN "PRESSURE2_EQUIP_BOILER_SCHEDULING_CHECK"."DEFAULT_COUNT" IS '默认数量';

ALTER TABLE "PRESSURE2_EQUIP_PIPE_SCHEDULING_CHECK" ADD COLUMN "DEFAULT_COUNT" INT;
COMMENT ON COLUMN "PRESSURE2_EQUIP_PIPE_SCHEDULING_CHECK"."DEFAULT_COUNT" IS '默认数量';

ALTER TABLE "PRESSURE2_EQUIP_PIPE_SCHEDULING_CHECK" MODIFY "DEFAULT_COUNT" INT DEFAULT (1) NULL;

ALTER TABLE "PRESSURE2_EQUIP_BOILER_SCHEDULING_CHECK" MODIFY "DEFAULT_COUNT" INT DEFAULT (1) NULL;

--已加

--20260627
ALTER TABLE "PRESSURE_TASK_ORDER" ADD COLUMN "SCHEME_ENTER_TIME" DATETIME(6);
ALTER TABLE "PRESSURE_TASK_ORDER" ADD COLUMN "SCHEME_APPROVAL_TIME" VARCHAR(50);
ALTER TABLE "PRESSURE_TASK_ORDER" ADD COLUMN "SCHEME_RATIFY_TIME" VARCHAR(50);
COMMENT ON COLUMN "PRESSURE_TASK_ORDER"."SCHEME_ENTER_TIME" IS '检验方案录入时间';
COMMENT ON COLUMN "PRESSURE_TASK_ORDER"."SCHEME_APPROVAL_TIME" IS '检验方案审核时间';
COMMENT ON COLUMN "PRESSURE_TASK_ORDER"."SCHEME_RATIFY_TIME" IS '检验方案审批时间';

ALTER TABLE "PRESSURE2_BOILER_TASK_ORDER_ITEM" ADD COLUMN "SCHEME_ENTER_TIME" DATETIME(6);
ALTER TABLE "PRESSURE2_BOILER_TASK_ORDER_ITEM" ADD COLUMN "SCHEME_APPROVAL_TIME" VARCHAR(50);
ALTER TABLE "PRESSURE2_BOILER_TASK_ORDER_ITEM" ADD COLUMN "SCHEME_RATIFY_TIME" VARCHAR(50);
COMMENT ON COLUMN "PRESSURE2_BOILER_TASK_ORDER_ITEM"."SCHEME_ENTER_TIME" IS '检验方案录入时间';
COMMENT ON COLUMN "PRESSURE2_BOILER_TASK_ORDER_ITEM"."SCHEME_APPROVAL_TIME" IS '检验方案审核时间';
COMMENT ON COLUMN "PRESSURE2_BOILER_TASK_ORDER_ITEM"."SCHEME_RATIFY_TIME" IS '检验方案审批时间';

--已加