ALTER TABLE "PRESSURE2_BOILER_CONNECT_RECORD_REPORT" ADD COLUMN "IS_SIGN" VARCHAR(50);
COMMENT ON COLUMN "PRESSURE2_BOILER_CONNECT_RECORD_REPORT"."IS_SIGN" IS '是否需要签名';

--20260624
ALTER TABLE "PRESSURE2_DYNAMIC_TB" ADD COLUMN "SKIP_PAGE_COUNT" INT DEFAULT (0);
COMMENT ON COLUMN "PRESSURE2_DYNAMIC_TB"."SKIP_PAGE_COUNT" IS '跳过的页码数';

